[#absl-SetMinLogLevel]
= xref:absl.adoc[absl]::SetMinLogLevel
:relfileprefix: ../
:mrdocs:

Updates the value of Minimum Log Level parameter&period;

== Synopsis

Declared in `&lt;absl&sol;log&sol;globals&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
SetMinLogLevel(xref:absl/LogSeverityAtLeast.adoc[absl::LogSeverityAtLeast] severity);
----

== Description

This function is async&hyphen;signal&hyphen;safe&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *severity*
| The new minimum log level&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
