[#absl-Mutex-InternalAttemptToUseMutexInFatalSignalHandler]
= xref:absl.adoc[absl]::xref:absl/Mutex.adoc[Mutex]::InternalAttemptToUseMutexInFatalSignalHandler
:relfileprefix: ../../
:mrdocs:

Prepares the `Mutex` implementation for re&hyphen;entry from within a fatal signal handler&period;

== Synopsis

Declared in `&lt;absl&sol;synchronization&sol;mutex&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
InternalAttemptToUseMutexInFatalSignalHandler();
----

== Description

Intended only for last&hyphen;ditch attempts to log crash information&period; It must be invoked from a signal handler that either loops forever or terminates the process&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
