[#absl-InlinedVector-at-01]
= xref:absl.adoc[absl]::xref:absl/InlinedVector.adoc[InlinedVector]::at
:relfileprefix: ../../
:mrdocs:

Overload of `InlinedVector&colon;&colon;at(&period;&period;&period;)` that returns a `const&lowbar;reference` to the `i`th element of the inlined vector&period;

== Synopsis

Declared in `&lt;absl&sol;container&sol;inlined&lowbar;vector&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:absl/InlinedVector/const_reference.adoc[const&lowbar;reference]
at(xref:absl/InlinedVector/size_type.adoc[size&lowbar;type] i) const;
----

== Description

NOTE&colon; if `i` is not within the required range of `InlinedVector&colon;&colon;at(&period;&period;&period;)`, in both debug and non&hyphen;debug builds, `std&colon;&colon;out&lowbar;of&lowbar;range` will be thrown&period;

== Return Value

A `const&lowbar;reference` to the `i`th element&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *i*
| The index of the element to access&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
