[#absl-FormatConversionSpec-is_basic]
= xref:absl.adoc[absl]::xref:absl/FormatConversionSpec.adoc[FormatConversionSpec]::is&lowbar;basic
:relfileprefix: ../../
:mrdocs:

Indicates that width and precision are not specified, and no additional flags are set for this conversion character in the format string&period;

== Synopsis

Declared in `&lt;absl&sol;strings&sol;str&lowbar;format&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
is&lowbar;basic() const;
----

== Return Value

`true` if no width, precision, or flags are set&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
