[#absl-FixedArray-max_size]
= xref:absl.adoc[absl]::xref:absl/FixedArray.adoc[FixedArray]::max&lowbar;size
:relfileprefix: ../../
:mrdocs:

Returns the largest possible value of `std&colon;&colon;distance(begin(), end())` for a `FixedArray&lt;T&gt;`&period; This is equivalent to the most possible addressable bytes over the number of bytes taken by T&period;

== Synopsis

Declared in `&lt;absl&sol;container&sol;fixed&lowbar;array&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
xref:absl/FixedArray/size_type.adoc[size&lowbar;type]
max&lowbar;size() const;
----

== Return Value

The maximum number of elements the fixed array can address&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
