[#absl-FailureSignalHandlerOptions-alarm_on_failure_secs]
= xref:absl.adoc[absl]::xref:absl/FailureSignalHandlerOptions.adoc[FailureSignalHandlerOptions]::alarm&lowbar;on&lowbar;failure&lowbar;secs
:relfileprefix: ../../
:mrdocs:

If positive, indicates the number of seconds after which the failure signal handler is invoked to abort the program&period; Setting such an alarm is useful in cases where the failure signal handler itself may become hung or deadlocked&period;

== Synopsis

Declared in `&lt;absl&sol;debugging&sol;failure&lowbar;signal&lowbar;handler&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int alarm&lowbar;on&lowbar;failure&lowbar;secs = 3;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
