[#absl-CordBuffer-kDefaultLimit]
= xref:absl.adoc[absl]::xref:absl/CordBuffer.adoc[CordBuffer]::kDefaultLimit
:relfileprefix: ../../
:mrdocs:

Default capacity limits of allocated CordBuffers&period;

== Synopsis

Declared in `&lt;absl&sol;strings&sol;cord&lowbar;buffer&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
size&lowbar;t kDefaultLimit = cord&lowbar;internal&colon;&colon;kMaxFlatLength;
----

== Description

See the class comments for more information on allocation limits&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
