[#absl-CordBuffer-kCustomLimit]
= xref:absl.adoc[absl]::xref:absl/CordBuffer.adoc[CordBuffer]::kCustomLimit
:relfileprefix: ../../
:mrdocs:

Maximum size for CreateWithCustomLimit() allocated buffers&period;

== Synopsis

Declared in `&lt;absl&sol;strings&sol;cord&lowbar;buffer&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
size&lowbar;t kCustomLimit = 64U &lt;&lt; 10;
----

== Description

Note that the effective capacity may be slightly less because of internal overhead of internal cord buffers&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
