[#absl-CordBuffer-capacity]
= xref:absl.adoc[absl]::xref:absl/CordBuffer.adoc[CordBuffer]::capacity
:relfileprefix: ../../
:mrdocs:

Returns the capacity of this instance&period; All instances have a non&hyphen;zero capacity&colon; default and `moved from` instances have a small internal buffer&period;

== Synopsis

Declared in `&lt;absl&sol;strings&sol;cord&lowbar;buffer&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
size&lowbar;t
capacity() const;
----

== Return Value

The capacity of this buffer&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
