[#absl-Clock-Sleep]
= xref:absl.adoc[absl]::xref:absl/Clock.adoc[Clock]::Sleep
:relfileprefix: ../../
:mrdocs:

Sleeps for the specified duration&period;

== Synopsis

Declared in `&lt;absl&sol;time&sol;clock&lowbar;interface&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
virtual
void
Sleep(xref:absl/Duration.adoc[absl::Duration] d) = 0;
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *d*
| The length of time to sleep&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
